11”x14” spread guidelines

Bleed area: 22”x14”
Extend your background to fill the full bleed
area when making a full bleed spread.

Do
• Double check if image size is as desired.
• Check if image is 300 DPI
• Save as a high resolution JPEG.
• Delete all Guidelines and text before saving.

Trim: 21.8”x13.8”
This is where we aim to cut your spreads.

Safe Area: 21”x13”
If using white borders, please keep inside the safe area.

Don’t
• Add additional bleed or print/crop marks to your files-just save your file to the size of this template.

Fold Mark
This is where we’ll fold your spreads.Make sure the
edges of the images line up if it’s not a full spread.