10”x8” spread guidelines

Bleed area: 20”x8”
Extend your background to fill the full bleed
area when making a full bleed spread.

Do
• Double check if image size is as desired.
• Check if image is 300 DPI
• Save as a high resolution JPEG.
• Delete all Guidelines and text before saving.

Trim: 19.8”x7.8”
This is where we aim to cut your spreads.

Safe Area: 19”x7”
If using white borders, please keep inside the safe area.

Don’t
• Add additional bleed or print/crop marks to your files-just save your file to the size of this template.

Fold Mark
This is where we’ll fold your spreads. Make sure the edges of the images line up if it’s not a full spread.