10”x10” spread guidelines

Bleed area: 20”x10”
Extend your background to fill the full bleed
area when making a full bleed spread.

Do
• Double check if image size is as desired.
• Check if image is 300 DPI
• Save as a high resolution JPEG.
• Delete all Guidelines and text before saving.

Trim: 19.8”x9.8”
This is where we aim to cut your spreads.

Don’t
• Add additional bleed or print/crop marks to your files-just save your file to the size of this template.

Safe Area: 19”x9”
If using white borders, please keep inside the safe area.

Fold Mark
This is where we’ll fold your spreads. Make sure the edges of the images line up if it’s not a full spread.